0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0.1 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

1

Position

Concentration of fibronectin

Concentration of fibronectin w/ resp. to position for old and new c_a equations

Old c_a equation New c_a equation