0 0.02 0.04 0.06 0.08 0.1

0.92

0.94

0.96

0.98

1 Time = .25

0 0.02 0.04 0.06 0.08 0.1 0.4 0.5 0.6 0.7 0.8 0.9 1 Time = .50

0 0.02 0.04 0.06 0.08 0.1 0 0.2 0.4 0.6 0.8 1 Time = .75

0 0.02 0.04 0.06 0.08 0.1 0 0.2 0.4 0.6 0.8 1 Time = .1

Old c_a New c_a

Old c_a New c_a

Old c_a New c_a

Old c_a New c_a