0 0.02 0.04 0.06 0.08 0.1 0 0.2 0.4 0.6 0.8 1

Position

Fibronectin Concentration

Time = 4.9412

0 0.02 0.04 0.06 0.08 0.1 0 0.2 0.4 0.6 0.8 1

Position

Time = 10.2941

0 0.02 0.04 0.06 0.08 0.1 0 0.2 0.4 0.6 0.8 1

Position

Time = 15.6471

0 0.02 0.04 0.06 0.08 0.1 0.5 0.6 0.7 0.8 0.9 1

Position

Time = 21